asdf

asdf 19 mai 2010

Résumé asdf

1 dsaf

-6 -4 -2 0 2 4 6

0 0.01 0.02 0.03 0.04 0.05

Tension U(t)/V

Temps t/s

Signal 20 Hz ; freq. echant. 400 Hz

T_e = 0, 0025 s �

V (t) = 5 · sin(2 · π · 20 · t) Echantillons

-6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6

0 0.01 0.02 0.03 0.04 0.05

Tension U(t)/V

Temps t/s

Signal 20 Hz ; freq. echant. 400 Hz

V (t) |V (t)|